\input JOSEPH
\global\ssecno=0\global\secno=1

\def\page {\leaders\hbox to 2mm{\hfil.\hfil}\hfill
%\rlap{\hbox to 6m{\hfill #1}}\par
}
\def\npage {\vfill\eject \global\notenumber=1}
\input A0.tex
\npage

\pageno=10
\input A21.tex
\npage
\input A221.tex

\npage
\input A222.tex
%\npage
\input A223.tex
\npage
\input A224.tex
\npage
\input A23.tex
     
\npage
\input Ref.tex
\npage
\input Sig.tex
\end