\input JOSEPH
\global\ssecno=0\global\secno=0

\def\page {\leaders\hbox to 2mm{\hfil.\hfil}\hfill
%\rlap{\hbox to 6m{\hfill #1}}\par
}
\def\npage {\vfill\eject \global\notenumber=1}

\input A0.tex
\npage
\input A10.tex
\npage
\input A11.tex
\npage
\input A12.tex
\npage
\input A13.tex
\npage
\input A14.tex
\npage
\input A15.tex
     
\npage
\input Ref.tex
\npage
\input Sig.tex

\end